<editorsettings description="XeLaTeX" icon="beta.png">
	<executable command="xelatex --interaction nonstopmode" />
	<imagefile extension=".pdf"/>
	<highlighter>
		<rule name="Math" regex="(\\\[.*\\\]|\$.*\$|\\begin\{equation\}(.*)\\end\{equation\})" color="#00a000" minimal="true"/>
		<rule name="Command" regex="\\[a-zA-Z@*]+" color="#800000"/>
		<rule name="Command argument" regex="\\[a-zA-Z@*]+\{([^\}]*)\}" color="blue"/>
		<rule name="Section commands" regex="\\(?:section|subsection|subsubsection|paragraph|subparagraph)(?:[*]?)\{([^\}]*)\}" color="black" bold="true"/>
		<rule name="Scribus specials" regex="\$scribus_(.*)\$" color="#FF00FF" minimal="true"/>
		<rule name="Comments" regex="(?:(?:^|[^\\])(?:\\\\)*)(%.*)" color="#808080" italic="true"/>
	</highlighter>
	<empty-frame-text>
		<i18n>
			<en>
				\section*{Manual}
				Your XeLaTeX-frames setup is working when you can read this text!
			</en>
			<de>
				\section*{Einführung}
				Wenn Sie diesen Text lesen können funktionieren \LaTeX-Frames bei Ihnen.
				Eigene Formel einzufügen ist sehr einfach:
				Mit der rechten Maustaste auf diesen Frame klicken $\Rightarrow$ Source bearbeiten\\
				Danach diesen Text durch ihren eigenen ersetzen:\\
				Ein Beispiel:
				Aus 
				\begin{verbatim}
				\[J = \int r^2 \mathrm{d}m\]
				\end{verbatim}
				wird
				\[J = \int r^2 \mathrm{d}m\]
			</de>
			<fr>
				\section*{Introduction}
				Votre cadre \LaTeX fonctionne lorsque vous pouvez lire ce texte !\\
				Placer des formules est très facile :\\
				Clique droit $\Rightarrow$ Edit Source\\
				Et remplacez ce texte par le vôtre. Voici un exemple :
				\begin{verbatim}
					\[J = \int r^2 \mathrm{d}m\]
				\end{verbatim}
				devient
				\[J = \int r^2 \mathrm{d}m\]
			</fr>
			<pl>
				\section*{Wprowadzenie}
				Gdy widzisz ten tekst w ramce renderowanej, to znaczy, ze \LaTeX jest 
				obslugiwany na twoim systemie i w ramkach renderowanych Scribusa.\\
				Aby dodac obsluge polskich znakow diakrytycznych, nalezy kliknac na 
				zakladke "Fonty/Naglowki" w edytorze kodu zrodlowego ramki i w polu 
				"Dodatkowe naglowki" dodac nastepujace polecenia:\\
				\begin{verbatim}
				\usepackage[utf8]{inputenc}
				\usepackage{polski}
				\end{verbatim}
				Wstawianie wzorow jest tez bardzo proste:\\
				Na przyklad zapis:\\
				\begin{verbatim}
				\[J = \int r^2 \mathrm{d}m\]
				\end{verbatim}
				zostanie zamieniony na wzor:
				\[J = \int r^2 \mathrm{d}m\]
			</pl>
			<ru>
				\section*{Вступление}
				Если вы читаете этот текст, значит блоки \LaTeX работают!\\
				Размещать формулы очень просто:\\
				В контекстном меню блока выберите команду Right click $\Rightarrow$ Изменить исходник\\
				И замените этот текст своим. Вот пример:
				\begin{verbatim}
					\[J = \int r^2 \mathrm{d}m\]
				\end{verbatim}
				becomes
				\[J = \int r^2 \mathrm{d}m\]
			</ru>
		</i18n>
	</empty-frame-text>
	<preamble>
		\documentclass[a4paper,$scribus_fontsize$]{extarticle}
		<!-- \usepackage[utf8]{inputenc} -->
		\usepackage[left=0cm,top=0cm,right=0cm,bottom=0cm,nohead,nofoot]{geometry}
		\usepackage{fontspec}
		\usepackage{xunicode}
		\usepackage{xltxtra}
		\usepackage{graphicx}
		\defaultfontfeatures{Scale=MatchLowercase}
		\setmainfont[Mapping=tex-text]{Times New Roman}
		\setsansfont[Mapping=tex-text]{Arial}
		\setmonofont{Courier New}
		\setlength{\parindent}{0pt}
		\usepackage{lettrine}
		\parskip=2mm
		\frenchspacing
		\title{Scribus-Latex-File}
		$scribus_font$
		$scribus_additionalheaders$
		\author{Scribus}
		\pagestyle{empty}
		\setlength{\textwidth}{$scribus_realwidth$ pt}
		\begin{document}
	</preamble>
	<postamble>
		\end{document}
	</postamble>
</editorsettings>
